\newcommand{\FbicombSopthotFabTime}{2.53}
\newcommand{\FbicombSopthotExtTime}{1.87}
\newcommand{\FbicombSopthotAirTime}{0.66}
\newcommand{\FbicombSopthotContactAtcool}{0.48}
