011000101000100000000000000000100100001011001
010000110100000100111100000001000100
10100000100101000000000
10000000000000000000101100010100001000100
000101000010010000100100010
10001001010010110010011000100000101100110

1000001010010001000110001

1110101101

00000001110000000000010100110100110111
000101001101100010000000001001
00000000011
0101110000010000110011001000100001100001000
11000100000000100111000000001
000000011000110
100000100011010011000011110100110101100
01010000000010000000100000
010000111101001
10000001010010000100100000001000001000010010

10000000000010100000010011001011010001011

01001000010000110011011000101
0110000010
001011000110100000000000110101100000101010
1100100110001110010100110000100100
1010010101001100
11100000010000000001101101111101010000
001100100001100101011110000001
0111110011010
110011110000100000010000000011010000100111
0101000101100001001010011
1000010010000
01010001010000011001000000011000000
01001000010000110010000000
10100110
11010010010010101000000000001010000100
0100000000001000100100
0000111100
