\newcommand{\FhotfillSsolFAAAAmAFFabTime}{14.06}
\newcommand{\FhotfillSsolFAAAAmAFExtTime}{12.44}
\newcommand{\FhotfillSsolFAAAAmAFAirTime}{1.62}
\newcommand{\FhotfillSsolFAAAAmAFMaxband}{5}
\newcommand{\FhotfillSsolFAAAAmAFDelta}{50}
\newcommand{\FhotfillSsolFAAAAmAFContactAtcool}{6.50}
\newcommand{\FhotfillSsolFAAAAmAFContactBtcool}{4.63}
