\newcommand{\FhotfillSsolABHAAmAFFabTime}{22.24}
\newcommand{\FhotfillSsolABHAAmAFExtTime}{10.66}
\newcommand{\FhotfillSsolABHAAmAFAirTime}{11.58}
\newcommand{\FhotfillSsolABHAAmAFMaxband}{5}
\newcommand{\FhotfillSsolABHAAmAFDelta}{1.7}
\newcommand{\FhotfillSsolABHAAmAFContactAtcool}{1.69}
