% Institute of Computing's logo
{ 
  \def\release{2010-03-08}
  \def\lastedit{2010-03-12 17:59:46 by stolfi}
  \typeout{logo-ic-unicamp.sty release {\release} last edit {\lastedit}} 
}

\ProvidesPackage{logo-ic-unicamp}
\RequirePackage{graphicx}

% MACROS DEFINED IN THIS PACKAGE
% 
%   \iclogo
%     This macro produces the IC logo packaged in a fixed-size square box,
%     without any lettering and with the necessary padding. Use
%     \scalebox{SCALE}{\iclogo} etc. to resize the logo.
%
%   \iclogonamed
%     This macro produces the IC logo with "INSTITUTO DE COMPUTAÇÃO"
%     written underneath. Use \scalebox{SCALE}{\iclogoname} etc. to
%     resize the logo and text together.
%
%   \iclogobare
%     This macro produces the IC abacus, without any lettering,
%     in a tight-fitting box, scaled to have the same width as
%     the standard logo box but with a different height.
% 
% PARAMETERS
%     These parameters determine the location and style of the default
%     logo images. Redefine with \renewcommand as appropriate.
% 
    \newcommand{\iclogosize}{60pt}
%     The height and width of the logo box, including name (if any)
%   
    \newcommand{\iclogofile}{logo-ic-unicamp.eps}
%     The name (relative to the current directory) of the EPS image file
%     that contains the IC-UNICAMP logo.

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Users should not need to read below this point

\advance \endlinechar by -256 % Ignore line breaks in this file

% Nominal logo dimensions (should match those of UNICAMP's logo!)
\def\iclogowidth{\iclogosize}    % Nominal width of logo box, with or without name
\def\iclogoheight{\iclogosize}   % Nominal height of logo box, with or without name

% IC abacus in a tight-fitting box, without name
\newcommand{\iclogobare}{
  \hbox{\includegraphics*[width=\iclogowidth]{\iclogofile}}
}

% IC logo in a standard-size box, top-aligned, without name
\newcommand{\iclogo}{
  \vbox to \iclogoheight{
    \offinterlineskip
    \hrule height 0pt width 0pt depth 0pt
    \vss
    \iclogobare
    \vss
    \hrule height 0pt width 0pt depth 0pt
  }
}

% Font for IC name below IC logo
\newcommand{\iclogofont}{
  \fontfamily{cmss}\fontseries{bx}\fontshape{n}\fontsize{7pt}{8pt}\selectfont
}

% IC logo in a standard-size box, top-aligned, with name below
\newcommand{\iclogonamed}{
  \vbox to \iclogoheight{
    \offinterlineskip
    \hrule height 0pt width 0pt depth 0pt
    \kern 1pt
    \hbox to \iclogowidth{
      \hss
      \scalebox{0.82}{\hbox{\iclogobare}}
      \hss
    }
    \kern 1pt
    \hbox to \iclogowidth{
      \iclogofont {~}I\hss N\hss S\hss T\hss I\hss T\hss U\hss T\hss O\hss {~}\hss D\hss E{~}\vphantom{ÇÃ}
    }
    \hbox to \iclogowidth{
      \iclogofont {~}C\hss O\hss M\hss P\hss U\hss T\hss A\hss \c{C}\hss \~{A}O{~}
    }
    \kern 2pt
    \vss
  }
}

\advance \endlinechar by 256 % Restore \endlinechar as before
