\newcommand{\FcombBCSoptzigFabTime}{1.79}
\newcommand{\FcombBCSoptzigExtTime}{1.26}
\newcommand{\FcombBCSoptzigAirTime}{0.53}
\newcommand{\FcombBCSoptzigContactAtcool}{0.40}
