\newcommand{\FcombBBSoptfabFabTime}{2.03}
\newcommand{\FcombBBSoptfabExtTime}{1.7}
\newcommand{\FcombBBSoptfabAirTime}{0.33}
\newcommand{\FcombBBSoptfabContactAtcool}{0.73}
