\newcommand{\FcombBCSoptfabFabTime}{1.74}
\newcommand{\FcombBCSoptfabExtTime}{1.26}
\newcommand{\FcombBCSoptfabAirTime}{0.48}
\newcommand{\FcombBCSoptfabContactAtcool}{0.96}
