\newcommand{\FcombBBSoptfabFabTime}{2.36}
\newcommand{\FcombBBSoptfabExtTime}{1.87}
\newcommand{\FcombBBSoptfabAirTime}{0.49}
\newcommand{\FcombBBSoptfabContactAtcool}{0.63}
