\newcommand{\FcombBCSoptfabFabTime}{1.54}
\newcommand{\FcombBCSoptfabExtTime}{1.06}
\newcommand{\FcombBCSoptfabAirTime}{0.48}
\newcommand{\FcombBCSoptfabContactAtcool}{0.86}
