\newcommand{\FcombBBSoptfabFabTime}{1.73}
\newcommand{\FcombBBSoptfabExtTime}{1.4}
\newcommand{\FcombBBSoptfabAirTime}{0.33}
\newcommand{\FcombBBSoptfabContactAtcool}{0.63}
