\newcommand{\FbicombSoptfabFabTime}{2.36}
\newcommand{\FbicombSoptfabExtTime}{1.87}
\newcommand{\FbicombSoptfabAirTime}{0.49}
\newcommand{\FbicombSoptfabContactAtcool}{0.63}
