\newcommand{\FcombBASopthotFabTime}{2.38}
\newcommand{\FcombBASopthotExtTime}{1.31}
\newcommand{\FcombBASopthotAirTime}{1.07}
\newcommand{\FcombBASopthotContactAtcool}{0.63}
