\newcommand{\FcombBBSopthotFabTime}{2.53}
\newcommand{\FcombBBSopthotExtTime}{1.87}
\newcommand{\FcombBBSopthotAirTime}{0.66}
\newcommand{\FcombBBSopthotContactAtcool}{0.48}
